= cowboy_http2(3)

== Name

cowboy_http2 - HTTP/2

== Description

The module `cowboy_http2` implements HTTP/2
as a Ranch protocol.

== Options

// @todo Might be worth moving cowboy_clear/tls/stream_h options
// to their respective manual, when they are added.

[source,erlang]
----
opts() :: #{
    active_n                       => pos_integer(),
    connection_type                => worker | supervisor,
    connection_window_margin_size  => 0..16#7fffffff,
    connection_window_update_threshold => 0..16#7fffffff,
    enable_connect_protocol        => boolean(),
    idle_timeout                   => timeout(),
    inactivity_timeout             => timeout(),
    initial_connection_window_size => 65535..16#7fffffff,
    initial_stream_window_size     => 0..16#7fffffff,
    logger                         => module(),
    max_concurrent_streams         => non_neg_integer() | infinity,
    max_connection_buffer_size     => non_neg_integer(),
    max_connection_window_size     => 0..16#7fffffff,
    max_decode_table_size          => non_neg_integer(),
    max_encode_table_size          => non_neg_integer(),
    max_frame_size_received        => 16384..16777215,
    max_frame_size_sent            => 16384..16777215 | infinity,
    max_received_frame_rate        => {pos_integer(), timeout()},
    max_reset_stream_rate          => {pos_integer(), timeout()},
    max_stream_buffer_size         => non_neg_integer(),
    max_stream_window_size         => 0..16#7fffffff,
    preface_timeout                => timeout(),
    proxy_header                   => boolean(),
    sendfile                       => boolean(),
    settings_timeout               => timeout(),
    stream_handlers                => [module()],
    stream_window_data_threshold   => 0..16#7fffffff,
    stream_window_margin_size      => 0..16#7fffffff,
    stream_window_update_threshold => 0..16#7fffffff
}
----

Configuration for the HTTP/2 protocol.

This configuration is passed to Cowboy when starting listeners
using `cowboy:start_clear/3` or `cowboy:start_tls/3` functions.

It can be updated without restarting listeners using the
Ranch functions `ranch:get_protocol_options/1` and
`ranch:set_protocol_options/2`.

The default value is given next to the option name:

active_n (100)::

The number of packets Cowboy will request from the socket at once.
This can be used to tweak the performance of the server. Higher
values reduce the number of times Cowboy need to request more
packets from the port driver at the expense of potentially
higher memory being used.

connection_type (supervisor)::

Whether the connection process also acts as a supervisor.

connection_window_margin_size (65535)::

Extra amount in bytes to be added to the window size when
updating the connection window. This is used to
ensure that there is always some space available in
the window.

connection_window_update_threshold (163840)::

The connection window will only get updated when its size
becomes lower than this threshold, in bytes. This is to
avoid sending too many `WINDOW_UPDATE` frames.

enable_connect_protocol (false)::

Whether to enable the extended CONNECT method to allow
protocols like Websocket to be used over an HTTP/2 stream.
This option is experimental and disabled by default.

idle_timeout (60000)::

Time in ms with no data received before Cowboy closes the connection.

inactivity_timeout (300000)::

Time in ms with nothing received at all before Cowboy closes the connection.

initial_connection_window_size (65535)::

Initial window size in bytes for the connection. This is the total amount
of data (from request bodies for example) that may be buffered
by the connection across all streams before the user code
explicitly requests it.
+
Note that this value cannot be lower than the default.

initial_stream_window_size (65535)::

Initial window size in bytes for new streams. This is the total amount
of data (from request bodies for example) that may be buffered
by a single stream before the user code explicitly requests it.

logger (error_logger)::

The module that will be used to write log messages.

max_concurrent_streams (infinity)::

Maximum number of concurrent streams allowed on the connection.

max_connection_buffer_size (16000000)::

Maximum size of all stream buffers for this connection, in bytes.
This is a soft limit used to apply backpressure to handlers that
send data faster than the HTTP/2 connection allows.

max_connection_window_size (16#7fffffff)::

Maximum connection window size in bytes. This is used as an upper bound
when calculating the window size, either when reading the request
body or receiving said body.

max_decode_table_size (4096)::

Maximum header table size in bytes used by the decoder. This is the value
advertised to the client. The client can then choose a header table size
equal or lower to the advertised value.

max_encode_table_size (4096)::

Maximum header table size in bytes used by the encoder. The server will
compare this value to what the client advertises and choose the smallest
one as the encoder's header table size.

max_frame_size_received (16384)::

Maximum size in bytes of the frames received by the server. This value is
advertised to the remote endpoint which can then decide to use
any value lower or equal for its frame sizes.

max_frame_size_sent (infinity)::

Maximum size in bytes of the frames sent by the server. This option allows
setting an upper limit to the frame sizes instead of blindly
following the client's advertised maximum.
+
Note that actual frame sizes may be lower than the limit when
there is not enough space left in the flow control window.

max_received_frame_rate ({10000, 10000})::

Maximum frame rate allowed per connection. The rate is expressed
as a tuple `{NumFrames, TimeMs}` indicating how many frames are
allowed over the given time period. This is similar to a supervisor
restart intensity/period.

max_reset_stream_rate ({10, 10000})::

Maximum reset stream rate per connection. This can be used to
protect against misbehaving or malicious peers that do not follow
the protocol, leading to the server resetting streams, by limiting
the number of streams that can be reset over a certain time period.
The rate is expressed as a tuple `{NumResets, TimeMs}`. This is
similar to a supervisor restart intensity/period.

max_stream_buffer_size (8000000)::

Maximum stream buffer size in bytes. This is a soft limit used
to apply backpressure to handlers that send data faster than
the HTTP/2 connection allows.

max_stream_window_size (16#7fffffff)::

Maximum stream window size in bytes. This is used as an upper bound
when calculating the window size, either when reading the request
body or receiving said body.

preface_timeout (5000)::

Time in ms Cowboy is willing to wait for the connection preface.

proxy_header (false)::

Whether incoming connections have a PROXY protocol header. The
proxy information will be passed forward via the `proxy_header`
key of the Req object.

sendfile (true)::

Whether the sendfile syscall may be used. It can be useful to disable
it on systems where the syscall has a buggy implementation, for example
under VirtualBox when using shared folders.

settings_timeout (5000)::

Time in ms Cowboy is willing to wait for a SETTINGS ack.

stream_handlers ([cowboy_stream_h])::

Ordered list of stream handlers that will handle all stream events.

stream_window_data_threshold (16384)::

Window threshold in bytes below which Cowboy will not attempt
to send data, with one exception. When Cowboy has data to send
and the window is high enough, Cowboy will always send the data,
regardless of this option.

stream_window_margin_size (65535)::

Extra amount in bytes to be added to the window size when
updating a stream's window. This is used to
ensure that there is always some space available in
the window.

stream_window_update_threshold (163840)::

A stream's window will only get updated when its size
becomes lower than this threshold, in bytes. This is to avoid sending
too many `WINDOW_UPDATE` frames.

== Changelog

* *2.8*: The `active_n` option was added.
* *2.8*: The `max_received_frame_rate` default value has
         been multiplied by 10 as the default was too low.
* *2.7*: Add the options `connection_window_margin_size`,
         `connection_window_update_threshold`,
         `max_connection_window_size`, `max_stream_window_size`,
         `stream_window_margin_size` and
         `stream_window_update_threshold` to configure
         behavior on sending WINDOW_UPDATE frames;
         `max_connection_buffer_size` and
         `max_stream_buffer_size` to apply backpressure
         when sending data too fast;
         `max_received_frame_rate` and `max_reset_stream_rate`
         to protect against various flood scenarios; and
         `stream_window_data_threshold` to control how small
         the DATA frames that Cowboy sends can get.
* *2.7*: The `logger` option was added.
* *2.6*: The `proxy_header` and `sendfile` options were added.
* *2.4*: Add the options `initial_connection_window_size`,
         `initial_stream_window_size`, `max_concurrent_streams`,
         `max_decode_table_size`, `max_encode_table_size`,
         `max_frame_size_received`, `max_frame_size_sent`
         and `settings_timeout` to configure HTTP/2 SETTINGS
         and related behavior.
* *2.4*: Add the experimental option `enable_connect_protocol`.
* *2.0*: Protocol introduced.

== See also

link:man:cowboy(7)[cowboy(7)],
link:man:cowboy_http(3)[cowboy_http(3)],
link:man:cowboy_websocket(3)[cowboy_websocket(3)]
